γN 0 5 10 15 20 25 30 35 40 45

)_γN P (

5−10

4−10

3−10

2−10

1−10 1

ALICE Double NBD fit

ALICE INEL = 5.02 TeV s pp,

< 3.9 labη

2.3 <

γN 0 5 10 15 20 25 30 35 40 45

Ratio to fit

0.5 1 1.5

ALI-PUB-562207

ALI-PUB-562207